ScanJet Scanner Options

Use the "Intensity" scroll bar to vary the intensity of scanned
images.  Higher intensity values result in lighter images, lower
intensity values result in darker images.

Use the "Contrast" scroll bar to vary the contrast of scanned images.
Higher contrast values result in more difference between light and
dark in the images, while lower contrast values result in less
difference.

Use the "B/W Dither Pattern" toggle buttons to choose a dither pattern
for black and white images.

If you have a ScanJet IIcx with a transparency adapter attached, the
"Disable Transparency Adapter" toggle button appears.  Turning this
toggle button on enables normal scanning even with the transparency
adapter attached and turned on.